400 450 500 550 600 650 700 750 800 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1.0

70 ^0C 80 ^0C 90 ^0C 100 ^0C 110 ^0C 120 ^0C

130 ^0C

140 ^0C

Photoswitch in HTPB

Wavelength (nm)

Abs.

150 ^0C